90D26L NS70L Century Continental (SDFC) MF

Manufacturer:
Century

Country of Manufacturer :
Philippines

Voltage :
12V

Specification :
75AH

CCA:
640

Terminal Size :
Big

Dimension (L x W x H x TH) :
259 x 172 x 205 x 225 mm

Warranty Period :
• 15 Month For Petrol
• 9 Month For Diesel

The post 90D26L NS70L Century Continental (SDFC) MF first appeared on Mount Everest Battery Sdn Bhd.